0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 0.2 0.4 0.6 0.8 1

Training Set Fraction

Error Rate Bound

Bounds for cmu-different-100 (with probability at least 0.9)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 0.2 0.4 0.6 0.8 1

Training Set Fraction

Bounds for cmu-different-1000 (with probability at least 0.9)